S5 0454+844

2CG 135+01 B3 0133+388 0136+391

X0115+63

Bo375

M 31

GRB 041015

IGR J00370+6122

IGR J01363+6610

V* V709Cas IGRJ00291+5934

IBIS/FCFOV

JEM-X/FOV

X0115+63(TOO)

Cas A

2CG 135+01

H 0115+634

NEW_1